              ************************************
               Installation of the PC/BILL system
              ************************************

1. Create the directory in which PC/BILL will be installed using
   the DOS command   mkdir \pcbill (or any other directory name).

2. Insert the distribution diskette in a floppy drive A:.

3. Change to  the drive with the distribution disk. Usually drive A:.
   If you have a second floppy drive insert any disk in it.  The 
   installation checks for the existence of a second drive but will
   not write to it.

4. The install command syntax is:   install 1 2 3

             where 1 is the drive with the distribution diskette.
                   2 is the drive where PC/BILL is to be installed.
                   3 is the directory name or full path to sub directory.

   The three entries are separated by spaces.

   Examples:   install a: c: \pcbill (Install in directory C:\PCBILL)
               install a: d: (Install in root directory of drive D:)

5. IF and ONLY IF you are UPGRADING FROM VERSION 3.2 OF PC/BILL ...
   you must convert the TIMEKPR file.  Beginning with version 3.3
   you can have 6 rates for each of a maximum of 20 timekeepers.
   This requires a different format for the TIMEKPR file.

   To create a copy of your ver 3.2 TIMEKPR file in ver 3.3 format
   enter ver33 at the DOS prompt. This will run VER33.BAT which
   will backup your old TIMEKPR file to TIMEKPR.BAK and create a
   new TIMEKPR file compatible with version 3.3 and later of PC/BILL.

   This should be done ONE TIME ONLY when upgrading from ver 3.2.

